0 50 100 150

-like γN 0

50

100

150

-true γN

7−10

6−10

5−10

4−10

3−10

2−10

1−10

)_{-like} γN|_{-true} γN P (

ALICE Simulation

= 5.02 TeV NNs p,−Pb

< 3.9 labη

2.3 <

HIJING

> 2 cell N ADC > 9 MPV,

ALI-PUB-562179

ALI-PUB-562179